 If someone has entered a message in a room since you were last in that 
room, Citadel-86 will consider it to be new to you, and you can use Goto to
 go to it automagically, or .Goto ROOMNAME to go to it manually (SEE: .Help 
GOTO).   If for some reason you enter a room and decide that you want 
the Citadel-86 system to think that you HAVEN'T been in that room, the Skip 
command is available to accomplish this. 
 
 The Skip command usage is identical to the Goto command usage.  To Skip 
the room that you are currently in and Goto the next room with unread messages: 
     Skip 
 Citadel-86 will print out the name of the room it is going to, and will 
remember 
that you've Skipped the room you are leaving. 
 
 To Skip the current room and goto room ROOMNAME: 
     .Skip ROOMNAME 
 
 If you get to the point where there are no more rooms with unread messages 
besides the one(s) that you've skipped, Citadel-86 will print out the list of 
rooms that you've skipped and change those rooms' status from Skipped back 
to simply rooms with unread messages. 
 
 Terminating with rooms on the Skipped list simply leaves them marked as having 
unread messages in them for the next time you login. 
                                                                                   
